-- Initial database schema for mGuard VPN Endpoint Server
-- This file is executed on first container startup

-- Ensure proper character encoding
ALTER DATABASE mguard_vpn CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;

-- Note: Tables are created by SQLAlchemy/Alembic
-- This file can be used for initial data or stored procedures if needed
